<ul>
	<li><strong>Obras Internas do Complexo Aquático – 2012 - <strong>acesso pelo picasa</strong>.</strong></li>
</ul>
<div>

[caption id="attachment_1020" align="alignleft" width="1381" caption="Obras Internas do Complexo Aquático – 2012"]<a href="https://plus.google.com/u/2/photos/105840026976593128343/albums/5816214902588837809"><img class="size-full wp-image-2023 " title="Obras Internas do Complexo Aquático – 2012" src="https://www.ufmg.br/cedecom/cteste/wp-content/uploads/2012/08/parque_aquatico_cte.png" alt="" width="1381" height="711" /></a>[/caption]

&nbsp;

&nbsp;

&nbsp;

&nbsp;

&nbsp;

&nbsp;

</div>